{% raw %}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% [paper-cutter clarifications]
%
% DO NOT EDIT THIS FILE (unless you know what you are doing).
% THIS IS A FILE SUPPLIED BY THE TEMPLATE.
% PLEASE EDIT main.tex INSTEAD.
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

% based on https://media.neurips.cc/Conferences/NeurIPS2021/Styles/neurips_2021.tex

\documentclass{article}

% if you need to pass options to natbib, use, e.g.:
%     \PassOptionsToPackage{numbers, compress}{natbib}
% before loading neurips_2021

% ready for submission
\usepackage{neurips_2021}

% to compile a preprint version, e.g., for submission to arXiv, add add the
% [preprint] option:
%     \usepackage[preprint]{neurips_2021}

% to compile a camera-ready version, add the [final] option, e.g.:
%     \usepackage[final]{neurips_2021}

% to avoid loading the natbib package, add option nonatbib:
%    \usepackage[nonatbib]{neurips_2021}

\usepackage[utf8]{inputenc} % allow utf-8 input
\usepackage[T1]{fontenc}    % use 8-bit T1 fonts
\usepackage{hyperref}       % hyperlinks
\usepackage{url}            % simple URL typesetting
\usepackage{booktabs}       % professional-quality tables
\usepackage{amsfonts}       % blackboard math symbols
\usepackage{nicefrac}       % compact symbols for 1/2, etc.
\usepackage{microtype}      % microtypography
\usepackage{xcolor}         % colors

\newcommand\bycite[1]{by~\citet{#1}}

\input{config}
\input{extras}
\input{preamble}
\input{metadata}

\begin{document}

\maketitle

\begin{abstract}
\input{abstract}
\end{abstract}

\input{main}

\bibliography{bibliography}
\bibliographystyle{abbrv}

\input{checklist.tex}

\ifwithappendix
\appendix
\section{Appendix}
\input{appendix}
\fi

\end{document}
{% endraw %}
